-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.215156151085
cusum  =  0.22185341838
eta  =  0.583930275059
hl_amp_ratio  =  0.5596570478
kurtosis  =  -0.234900666789
n_points  =  300
period  =  0.606425852997
period_SNR  =  44.4638428674
period_log10FAP  =  -36.5852035017
period_uncertainty  =  0.000105531440663
phase_cusum  =  0.252438942224
phase_eta  =  0.516718742879
phi21  =  4.10411336444
phi31  =  4.67564451682
quartile31  =  0.2525
r21  =  0.301038501626
r31  =  0.0900598255186
shapiro_w  =  0.943403601646
skewness  =  -0.714787190109
slope_per10  =  -0.113477595412
slope_per90  =  0.127890170172
stetson_k  =  0.770181028908
weighted_mean  =  14.5643892764
weighted_std  =  0.178763009939
