-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.244316766103
cusum  =  0.142626862601
eta  =  0.595395174829
hl_amp_ratio  =  0.484581151702
kurtosis  =  -0.508736506338
n_points  =  290
period  =  0.566362599779
period_SNR  =  37.2004956028
period_log10FAP  =  -29.8799965119
period_uncertainty  =  0.000110265939629
phase_cusum  =  0.240842204147
phase_eta  =  0.466058838315
phi21  =  -1.96389004868
phi31  =  -0.729289654955
quartile31  =  0.29
r21  =  0.485179434008
r31  =  0.235430221944
shapiro_w  =  0.932700514793
skewness  =  -0.678444200105
slope_per10  =  -0.132200000808
slope_per90  =  0.286749994848
stetson_k  =  0.764325593741
weighted_mean  =  14.0074772442
weighted_std  =  0.216339271074
