-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.351844457395
cusum  =  0.138345290698
eta  =  0.581085476541
hl_amp_ratio  =  0.472259775917
kurtosis  =  -0.773233230335
n_points  =  285
period  =  0.479430934461
period_SNR  =  42.2875330337
period_log10FAP  =  -36.0785611418
period_uncertainty  =  0.000105340501217
phase_cusum  =  0.28894336793
phase_eta  =  0.379482512498
phi21  =  4.02934259704
phi31  =  5.33927315209
quartile31  =  0.52
r21  =  0.358548409609
r31  =  0.149165890296
shapiro_w  =  0.917371332645
skewness  =  -0.61232339206
slope_per10  =  -0.122902388733
slope_per90  =  0.156325167969
stetson_k  =  0.782547355115
weighted_mean  =  13.6765352532
weighted_std  =  0.309096420745
