-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.31


######### Lightcurve features #########

amplitude  =  0.163079731191
cusum  =  0.239342628033
eta  =  0.450626432559
hl_amp_ratio  =  0.20921530482
kurtosis  =  -0.999610121308
n_points  =  104
period  =  0.342053290256
period_SNR  =  14.6124552389
period_log10FAP  =  -12.7863891829
period_uncertainty  =  2.60790860205e-05
phase_cusum  =  0.253719857183
phase_eta  =  0.119830495922
phi21  =  1.40846836687
phi31  =  3.89480800177
quartile31  =  0.1825
r21  =  0.0699454332074
r31  =  0.0941813634253
shapiro_w  =  0.848567128181
skewness  =  -0.717611193168
slope_per10  =  -0.311467869655
slope_per90  =  0.359757009454
stetson_k  =  0.719210590939
weighted_mean  =  13.4504807692
weighted_std  =  0.120897125751
