-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.63


######### Lightcurve features #########

amplitude  =  0.204881571145
cusum  =  0.106345871855
eta  =  0.678548023555
hl_amp_ratio  =  0.584823880203
kurtosis  =  -0.415111974953
n_points  =  339
period  =  0.842242040706
period_SNR  =  29.0972221697
period_log10FAP  =  -28.0801525162
period_uncertainty  =  0.000190449095978
phase_cusum  =  0.220451891395
phase_eta  =  0.783724499875
phi21  =  -3.4001955345
phi31  =  -4.84511649498
quartile31  =  0.33
r21  =  0.238434109988
r31  =  0.200721950532
shapiro_w  =  0.96104568243
skewness  =  -0.441524012955
slope_per10  =  -0.0711819344728
slope_per90  =  0.205666664988
stetson_k  =  0.78547722767
weighted_mean  =  14.5479819794
weighted_std  =  0.224028932261
