-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.350817727152
cusum  =  0.134502383019
eta  =  0.505947395137
hl_amp_ratio  =  0.267569327445
kurtosis  =  -0.870685566298
n_points  =  386
period  =  0.597000300945
period_SNR  =  50.3101735832
period_log10FAP  =  -56.6840739155
period_uncertainty  =  0.000115169504822
phase_cusum  =  0.246012708662
phase_eta  =  0.0800976547366
phi21  =  0.829142219359
phi31  =  1.94521221859
quartile31  =  0.5275
r21  =  0.457789145388
r31  =  0.302227653697
shapiro_w  =  0.87805300951
skewness  =  -0.710475121459
slope_per10  =  -0.134677676768
slope_per90  =  0.168806240415
stetson_k  =  0.741820344187
weighted_mean  =  13.6176062598
weighted_std  =  0.315089520864
