-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.20900210199
cusum  =  0.11205218469
eta  =  0.532110239958
hl_amp_ratio  =  0.548249921214
kurtosis  =  -0.674405839883
n_points  =  315
period  =  0.575790813169
period_SNR  =  49.3700328086
period_log10FAP  =  -42.7104485305
period_uncertainty  =  0.000114198896434
phase_cusum  =  0.242257889019
phase_eta  =  0.408403277119
phi21  =  4.36682172476
phi31  =  5.86443955684
quartile31  =  0.295
r21  =  0.38828224508
r31  =  0.160913871735
shapiro_w  =  0.958346962929
skewness  =  -0.434320174094
slope_per10  =  -0.107704481172
slope_per90  =  0.189378616571
stetson_k  =  0.814385434673
weighted_mean  =  13.6936048874
weighted_std  =  0.176720285729
