-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.390115072992
cusum  =  0.197392663502
eta  =  0.886559103035
hl_amp_ratio  =  0.150121206324
kurtosis  =  -0.419044830048
n_points  =  83
period  =  0.479611358367
period_SNR  =  16.830378733
period_log10FAP  =  -9.32142913978
period_uncertainty  =  0.000154434378578
phase_cusum  =  0.306553998092
phase_eta  =  0.225621963286
phi21  =  0.766635758325
phi31  =  -1.19600099721
quartile31  =  0.375
r21  =  0.382403734214
r31  =  0.167141821511
shapiro_w  =  0.844983875751
skewness  =  -0.920997785162
slope_per10  =  -0.17736581963
slope_per90  =  0.427801987237
stetson_k  =  0.672243018629
weighted_mean  =  8.77204819277
weighted_std  =  0.283798499007
