-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.53


######### Lightcurve features #########

amplitude  =  0.525073497677
cusum  =  0.171437252568
eta  =  2.414081115
hl_amp_ratio  =  0.365448198993
kurtosis  =  -0.503852116763
n_points  =  24
period  =  0.0501949284108
period_SNR  =  7.44799156465
period_log10FAP  =  0.0
period_uncertainty  =  2.1704976435e-06
phase_cusum  =  0.29389304096
phase_eta  =  0.829555089827
phi21  =  3.45756808315
phi31  =  3.69625577892
quartile31  =  0.495
r21  =  0.433812040851
r31  =  0.011679104922
shapiro_w  =  0.848721385002
skewness  =  -0.916311897378
slope_per10  =  -0.0396820018548
slope_per90  =  0.0278823882362
stetson_k  =  0.667065023653
weighted_mean  =  14.342965332
weighted_std  =  0.363207722258
