-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.357025858799
cusum  =  0.185762795047
eta  =  0.84563766086
hl_amp_ratio  =  0.34338945749
kurtosis  =  -0.131551650981
n_points  =  131
period  =  0.546597891578
period_SNR  =  21.6632008026
period_log10FAP  =  -11.211904003
period_uncertainty  =  0.000136675105886
phase_cusum  =  0.283326391636
phase_eta  =  0.189796803122
phi21  =  3.69408919698
phi31  =  4.424643901
quartile31  =  0.42
r21  =  0.473086644567
r31  =  0.393037595265
shapiro_w  =  0.889503240585
skewness  =  -0.9463576171
slope_per10  =  -0.183470836938
slope_per90  =  0.256382003407
stetson_k  =  0.675326921585
weighted_mean  =  16.2528508932
weighted_std  =  0.306692203087
