-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.307491394906
cusum  =  0.0998086036806
eta  =  0.56179268875
hl_amp_ratio  =  0.496820065495
kurtosis  =  -0.71776571693
n_points  =  494
period  =  0.620664043062
period_SNR  =  64.1368690527
period_log10FAP  =  -71.8796716739
period_uncertainty  =  0.000103107193087
phase_cusum  =  0.274893224311
phase_eta  =  0.138208961622
phi21  =  0.793455937853
phi31  =  1.73975673115
quartile31  =  0.4
r21  =  0.366426041964
r31  =  0.301123115645
shapiro_w  =  0.913956046104
skewness  =  -0.631190700023
slope_per10  =  -0.133555222545
slope_per90  =  0.193481661956
stetson_k  =  0.795388614297
weighted_mean  =  14.2520693444
weighted_std  =  0.24955451081
