-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.7


######### Lightcurve features #########

amplitude  =  0.257144063601
cusum  =  0.308479318804
eta  =  0.437792090295
hl_amp_ratio  =  1.19187536618
kurtosis  =  -0.715281933716
n_points  =  119
period  =  0.658969006989
period_SNR  =  13.6072250196
period_log10FAP  =  -7.45727203254
period_uncertainty  =  0.000168476831077
phase_cusum  =  0.223944467217
phase_eta  =  0.394129792096
phi21  =  1.40049598211
phi31  =  2.20924228901
quartile31  =  0.33
r21  =  0.39783121197
r31  =  0.29145376068
shapiro_w  =  0.97442227602
skewness  =  -0.00214174422451
slope_per10  =  -0.232133328294
slope_per90  =  0.566151248044
stetson_k  =  0.784993644312
weighted_mean  =  15.6738275883
weighted_std  =  0.233164406897
