-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.283272184993
cusum  =  0.124073259814
eta  =  0.607685728169
hl_amp_ratio  =  0.346424735066
kurtosis  =  -0.424593106937
n_points  =  337
period  =  0.663671251711
period_SNR  =  39.9080274041
period_log10FAP  =  -41.4366161811
period_uncertainty  =  0.00015143092845
phase_cusum  =  0.267455100828
phase_eta  =  0.211834984228
phi21  =  -2.24512252537
phi31  =  -4.41135214213
quartile31  =  0.32
r21  =  0.463211647055
r31  =  0.323942651804
shapiro_w  =  0.895872294903
skewness  =  -0.845897885557
slope_per10  =  -0.140422637618
slope_per90  =  0.186853514793
stetson_k  =  0.719530174081
weighted_mean  =  15.9055677192
weighted_std  =  0.239798844377
