-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.274584966781
cusum  =  0.117109874116
eta  =  0.586608894018
hl_amp_ratio  =  0.645889345418
kurtosis  =  -0.926544560723
n_points  =  310
period  =  0.684100238625
period_SNR  =  40.1510141314
period_log10FAP  =  -43.0917122866
period_uncertainty  =  0.000131234703574
phase_cusum  =  0.292434432743
phase_eta  =  0.0278479999107
phi21  =  1.06710960887
phi31  =  2.32070935962
quartile31  =  0.3375
r21  =  0.475566599791
r31  =  0.281166425312
shapiro_w  =  0.933570981026
skewness  =  -0.476162015255
slope_per10  =  -0.205786577258
slope_per90  =  0.501199983992
stetson_k  =  0.84678404457
weighted_mean  =  13.9773029174
weighted_std  =  0.210253875651
