-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.33


######### Lightcurve features #########

amplitude  =  0.104407464055
cusum  =  0.340271213967
eta  =  0.902308938698
hl_amp_ratio  =  2.71586815763
kurtosis  =  -1.56966098606
n_points  =  15
period  =  0.89449554559
period_SNR  =  4.02596309409
period_log10FAP  =  0.0
period_uncertainty  =  0.000297125276295
phase_cusum  =  0.421288169674
phase_eta  =  0.93572778828
phi21  =  3.87741452084
phi31  =  4.87617890007
quartile31  =  0.13
r21  =  0.477497882064
r31  =  0.532322702159
shapiro_w  =  0.871178150177
skewness  =  0.240891435975
slope_per10  =  -0.918999966234
slope_per90  =  2.1148895712
stetson_k  =  0.819137882148
weighted_mean  =  10.5833333333
weighted_std  =  0.06857275131
